0 0.005 0.01 0.015 0.02 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

10000

mixing ratio height (m)

Water Content

q_v(vapor) q_c(cloud water) q_r(rain) q_i(ice) q_t(total)

0 1 2 3 x 10^{-5} 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

10000

rate (s^{- 1})

Processes

Cc(condensation) Ac(autoconversion) Kc(collection) Fr(rain fallout) Gl(glaciation) Fi(ice fallout)

Homework 3 : Cold Cloud Water Continuity