-20 -10 0 10 0

2000

4000

6000

8000

10000

12000

14000

Tc-Te height (m)

Temperature (C) case 3 case 4

-40 -20 0 20 0

2000

4000

6000

8000

10000

12000

14000

16000

18000

Temperature (C)

Cloud Temperature & Sounding

case 3 environment case 4