-0.6 -0.4 -0.2 0 0.2 0.4 0

2000

4000

6000

8000

10000

12000

14000

Buoyancy

buoyancy (m s^{- 2}) height (m)

B_1 B_2 B_3 B

-0.15 -0.1 -0.05 0 0.05 0.1 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

10000

Buoyancy

buoyancy (m s^{- 2})

B_1 B_2 B_3 B case 6 case 5