0 50 100 150

2.05

2.10

2.15

2.20

2.25

2.30

2.35

2.40

2.45

2.50

2.55

Iteration

MAE

Bias Correction Minimization, 2004070100 - 2004073100, fhr 24 MAE MAE for final, independant verification